Fits files for VLT programme: 68.A-0617A
                        date: 2002-02-19
                        type: calib

Remarks:
***: parameter value not set
RA, DEC: J2000; EXP: exposure time in secs; SLT: slit width (arcsec); CL: collimator; DC = DPR_CATG (S - SCIENCE, C - CALIB, T - TEST)
DTYPE: DPR_TYPE; DTECH: DPR_TECH; NX: number of exposures within template; X#: running number of exposure; CON = CONAD

TARGET       RA         DEC       EXP   AIRM  FILTER   SLT GRIS CL LST      DC DTYPE     DTECH    OB_ID     TPL_ID        NX X# CON  PORT BIN WINDOWS   archive_filename (.fits)      SETUP_CHECKSUM
---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------
twil-0427    04 29 15  -36 18 35  1.39  1.02  U_BESS   *** **** SR 04:52:34 C  FLAT,SKY  IMAGE    200111339 img_cal_skyf  10  5 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-19T23:35:14.963 +1+00+00+00C+33D+00
twil-0427    04 29 16  -36 18 25  2.07  1.02  U_BESS   *** **** SR 04:53:28 C  FLAT,SKY  IMAGE    200111339 img_cal_skyf  10  6 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-19T23:36:08.276 +1+00+00+00C+33D+00
twil-0427    04 29 16  -36 18 15  2.54  1.02  U_BESS   *** **** SR 04:54:21 C  FLAT,SKY  IMAGE    200111339 img_cal_skyf  10  7 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-19T23:37:01.932 +1+00+00+00C+33D+00
twil-0427    04 29 17  -36 18 05  3.16  1.02  U_BESS   *** **** SR 04:55:16 C  FLAT,SKY  IMAGE    200111339 img_cal_skyf  10  8 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-19T23:37:57.226 +1+00+00+00C+33D+00
SA98-670     06 52 14  -00 19 49  40.0  1.16  U_BESS   *** **** SR 05:32:30 C  STD       IMAGE    200111158 img_obs_crsp   1  1 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T00:15:04.466 +1+00+00+00C+33D+00
PG1047+003   10 50 08  -00 01 04  39.9  2.09  U_BESS   *** **** SR 14:44:02 C  STD       IMAGE    200111175 img_obs_crsp   1  1 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T09:25:05.312 +1+00+00+00C+33D+00
PG1528+062   15 30 44  +06 01 04  39.9  1.17  U_BESS   *** **** SR 14:53:09 C  STD       IMAGE    200111173 img_obs_crsp   1  1 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T09:34:11.613 +1+00+00+00C+33D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  1 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T10:13:39.479 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  2 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T10:14:26.183 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  3 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T10:15:12.356 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  4 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T10:15:58.448 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  5 1.46 ABCD 1x1 2080x2048 FORS1.2002-02-20T10:16:45.283 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  1 1.46 A    1x1 2080x2048 FORS1.2002-02-20T10:35:48.427 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  2 1.46 A    1x1 2080x2048 FORS1.2002-02-20T10:37:31.830 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  3 1.46 A    1x1 2080x2048 FORS1.2002-02-20T10:39:15.149 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  4 1.46 A    1x1 2080x2048 FORS1.2002-02-20T10:40:58.381 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    0         img_cal_bias   5  5 1.46 A    1x1 2080x2048 FORS1.2002-02-20T10:42:41.884 +1+00+00+00C+00D+00
***          ***       ***        0.00  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  1 1.46 A    1x1 2080x2048 FORS1.2002-03-13T15:02:04.127 +1+00+00+00C+00D+00
***          ***       ***        0.00  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  2 1.46 A    1x1 2080x2048 FORS1.2002-03-13T15:03:46.911 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  3 1.46 A    1x1 2080x2048 FORS1.2002-03-13T15:05:29.827 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  4 1.46 A    1x1 2080x2048 FORS1.2002-03-13T15:07:12.785 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  5 1.46 A    1x1 2080x2048 FORS1.2002-03-13T15:08:55.994 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  1 1.46 A    1x1 2080x2048 FORS1.2002-03-14T11:28:43.497 +1+00+00+00C+00D+00
***          ***       ***        0.00  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  2 1.46 A    1x1 2080x2048 FORS1.2002-03-14T11:30:26.318 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  3 1.46 A    1x1 2080x2048 FORS1.2002-03-14T11:32:09.211 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  4 1.46 A    1x1 2080x2048 FORS1.2002-03-14T11:33:52.113 +1+00+00+00C+00D+00
***          ***       ***        0.01  ***    ****    *** **** SR ***      C  BIAS      IMAGE    200115616 img_cal_bias   5  5 1.46 A    1x1 2080x2048 FORS1.2002-03-14T11:35:34.843 +1+00+00+00C+00D+00

----------------------------------------------
Master calibration files

Remarks:
***: parameter value not set; N: number of raw frames to create master; MEAN: mean exposure level in ADU

CALIB_NAME                                         FILTER      SLT GRIS CL PRO_CATG                   CON  PORT BIN WINDOW      MEAN   N  PIPE_NAME                                      SETUP_CHECKSUM
---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------
F1_MBIA_020219A_fhi_1x1.fits                        ****        *** **** ** MASTER_BIAS                1.46 ABCD 1*1 2048*2048  235.63   5 r.FORS1.2002-02-20T10:13:39.479_tpl_0000.fit   +00+00+00+00C+00D+00
F1_MKFI_020219A_UBE_fhi_1x1s.fits                  U_BESS       *** **** SR MASTER_SKY_FLAT_IMG        1.46 ABCD 1*1 2048*2048  21976.   4 r.FORS1.2002-02-19T23:35:14.963_tpl_0000.fit   +1+00+00+00C+33D+00
F1_MSFL_020313A_G600B_S13F__L1shi_1x1s.fits         ****        1_3 600B SR MASTER_NORM_FLAT_LSS       1.46 A    1*1 2048*2048  0.9988   3 r.FORS1.2002-03-13T13:08:04.886_tpl_0000.fit   +1+00+00+12C+00Dls13
F1_MSFL_020313A_G600B_S13F__L2shi_1x1s.fits         ****        1_3 600B SR MASTER_NORM_FLAT_LSS       1.46 A    1*1 2048*2048  0.9988   3 r.FORS1.2002-03-13T13:22:37.372_tpl_0000.fit   +1+00+00+12C+00Dls13
F1_MSFL_020313B_G600B_S13F__L1shi_1x1s.fits         ****        1_3 600B SR MASTER_NORM_FLAT_LSS       1.46 A    1*1 2048*2048  0.9988   3 r.FORS1.2002-03-14T10:52:01.249_tpl_0000.fit   +1+00+00+12C+00Dls13
F1_MSFL_020313B_G600B_S13F__L2shi_1x1s.fits         ****        1_3 600B SR MASTER_NORM_FLAT_LSS       1.46 A    1*1 2048*2048  0.9988   3 r.FORS1.2002-03-14T11:06:32.837_tpl_0000.fit   +1+00+00+12C+00Dls13
F1_PSTI_020211A_fhi_1x1s.fits                      U_BESS       *** **** SR STANDARD_REDUCED_IMG       1.46 ABCD 1*1 2048*2048  478.57   * r.FORS1.2002-02-12T09:36:13.113_0003.fits      +1+00+00+00C+33D+00
F1_PSTI_020211F_fhi_1x1s.fits                      U_BESS       *** **** SR STANDARD_REDUCED_IMG       1.46 ABCD 1*1 2048*2048  2104.7   * r.FORS1.2002-02-12T09:46:21.114_0003.fits      +1+00+00+00C+33D+00
F1_PSTI_020219A_fhi_1x1s.fits                      U_BESS       *** **** SR STANDARD_REDUCED_IMG       1.46 ABCD 1*1 2048*2048  145.31   * r.FORS1.2002-02-20T00:15:04.466_0003.fits      +1+00+00+00C+33D+00
F1_PSTI_020219F_fhi_1x1s.fits                      U_BESS       *** **** SR STANDARD_REDUCED_IMG       1.46 ABCD 1*1 2048*2048  34.825   * r.FORS1.2002-02-20T09:25:05.312_0003.fits      +1+00+00+00C+33D+00
F1_PSTI_020219K_fhi_1x1s.fits                      U_BESS       *** **** SR STANDARD_REDUCED_IMG       1.46 ABCD 1*1 2048*2048  80.380   * r.FORS1.2002-02-20T09:34:11.613_0003.fits      +1+00+00+00C+33D+00
F1_PWDL_020313A_G600B_S13F___1x1s.tfits             ****        1_3 600B SR DISP_COEFF_LSS             **** A    ***    ***          *   * r.FORS1.2002-03-13T13:38:13.017_0000.tfits     +1+00+00+12C+00Dls13
F1_PWDL_020313B_G600B_S13F___1x1s.tfits             ****        1_3 600B SR DISP_COEFF_LSS             **** A    ***    ***          *   * r.FORS1.2002-03-14T11:22:08.719_0000.tfits     +1+00+00+12C+00Dls13

Apr 17, 02 11:20 Page 1/1

list_of_all_calibs.txt

Printed by FORS1 account

Wednesday April 17, 2002 1/1 list_of_all_calibs.txt