QC0 report (airmass, seeing, moon distance, fractional lunar illumination) for FORS1 programme 68.A-0617A
=============================================================================================================

This list compares the QC0 parameters specified in your OBs with those actually measured on Paranal during observations.

The alarm flag is set to ’A’ if a constraint has been nominally violated.

The columns have the following meaning:

targt: specified in OB; measd: measured during observation
F:  flag (A = alarm)
units: seeing in arcs; moon distance in degrees; FLI in %

filename                          | OB_ID  | AIRM          | SEEING      | MOON_DIST     | FLI
                                  |        | targt measd F | trgt msd  F | targt measd F | targt measd F
--------------------------------------------------------------------------------------------------------
FORS1.2002-01-22T07:43:52.975.fits | 110099 | 1.300 1.072   | 0.80 0.46   |  90.0 144.9   | 0.000 0.552 A
FORS1.2002-01-22T08:04:40.531.fits | 110099 | 1.300 1.055   | 0.80 0.45   |  90.0 144.6   | 0.000 0.554 A
FORS1.2002-01-22T08:15:13.577.fits | 110099 | 1.300 1.049   | 0.80 0.44   |  90.0 144.5   | 0.000 0.555 A
FORS1.2002-01-22T08:32:19.138.fits | 110099 | 1.300 1.046   | 0.80 0.46   |  90.0 144.3   | 0.000 0.556 A
FORS1.2002-01-22T08:45:21.360.fits | 110099 | 1.300 1.046   | 0.80 0.52   |  90.0 144.2   | 0.000 0.557 A
FORS1.2002-01-22T08:57:12.438.fits | 110099 | 1.300 1.049   | 0.80 0.49   |  90.0 144.1   | 0.000 0.558 A
FORS1.2002-02-09T05:30:20.819.fits | 110100 | 1.300 1.184   | 0.80 0.51   |  90.0 101.8   | 0.000 0.085 A
FORS1.2002-02-09T05:40:54.555.fits | 110100 | 1.300 1.157   | 0.80 0.53   |  90.0 101.9   | 0.000 0.085 A
FORS1.2002-02-09T05:51:26.171.fits | 110100 | 1.300 1.134   | 0.80 0.56   |  90.0 102.0   | 0.000 0.084 A
FORS1.2002-02-09T06:02:00.144.fits | 110100 | 1.300 1.115   | 0.80 0.59   |  90.0 102.1   | 0.000 0.084 A
FORS1.2002-02-09T06:12:33.716.fits | 110100 | 1.300 1.097   | 0.80 0.55   |  90.0 102.2   | 0.000 0.083 A
FORS1.2002-02-09T06:23:05.319.fits | 110100 | 1.300 1.083   | 0.80 0.57   |  90.0 102.3   | 0.000 0.083 A
FORS1.2002-02-09T06:33:57.128.fits | 110101 | 1.300 1.071   | 0.80 0.46   |  90.0 102.4   | 0.000 0.082 A
FORS1.2002-02-09T06:46:15.383.fits | 110101 | 1.300 1.059   | 0.80 0.82   |  90.0 102.5   | 0.000 0.082 A
FORS1.2002-02-09T06:56:53.509.fits | 110101 | 1.300 1.053   | 0.80 0.95 A |  90.0 102.6   | 0.000 0.081 A
FORS1.2002-02-09T07:08:14.561.fits | 110101 | 1.300 1.049   | 0.80 0.96 A |  90.0 102.7   | 0.000 0.081 A
FORS1.2002-02-12T05:17:16.584.fits | 110101 | 1.300 1.187   | 0.80 0.61   |  90.0 136.9   | 0.000 0.001 A
FORS1.2002-02-12T05:28:09.054.fits | 110101 | 1.300 1.160   | 0.80 0.60   |  90.0 137.0   | 0.000 0.001 A
FORS1.2002-02-12T05:38:50.107.fits | 110101 | 1.300 1.136   | 0.80 0.66   |  90.0 137.1   | 0.000 0.001 A
FORS1.2002-02-12T05:50:26.050.fits | 110101 | 1.300 1.113   | 0.80 0.60   |  90.0 137.2   | 0.000 0.001 A
FORS1.2002-02-12T06:01:14.800.fits | 110101 | 1.300 1.096   | 0.80 0.69   |  90.0 137.3   | 0.000 0.001 A
FORS1.2002-02-12T06:14:48.297.fits | 110101 | 1.300 1.079   | 0.80 0.63   |  90.0 137.5   | 0.000 0.001 A
FORS1.2002-01-15T06:58:12.232.fits | 110102 | 1.400 1.220   | 0.80 0.93 A |  90.0 129.5   | 0.400 0.030
FORS1.2002-01-15T07:04:10.451.fits | 110102 | 1.400 1.202   | 0.80 0.92 A |  90.0 129.6   | 0.400 0.030
FORS1.2002-01-15T07:10:11.328.fits | 110102 | 1.400 1.185   | 0.80 0.82   |  90.0 129.6   | 0.400 0.031
FORS1.2002-01-15T07:16:09.273.fits | 110102 | 1.400 1.169   | 0.80 0.72   |  90.0 129.7   | 0.400 0.031
FORS1.2002-01-15T07:22:10.371.fits | 110102 | 1.400 1.155   | 0.80 0.64   |  90.0 129.7   | 0.400 0.031
FORS1.2002-01-15T07:28:07.441.fits | 110102 | 1.400 1.142   | 0.80 0.64   |  90.0 129.8   | 0.400 0.031
FORS1.2002-01-15T07:34:05.369.fits | 110102 | 1.400 1.130   | 0.80 0.62   |  90.0 129.9   | 0.400 0.031
FORS1.2002-01-15T07:40:04.504.fits | 110102 | 1.400 1.118   | 0.80 0.62   |  90.0 129.9   | 0.400 0.032
FORS1.2002-01-15T07:50:35.174.fits | 110102 | 1.400 1.101   | 0.80 0.62   |  90.0 130.1   | 0.400 0.032
FORS1.2002-01-15T07:56:36.815.fits | 110102 | 1.400 1.092   | 0.80 0.67   |  90.0 130.1   | 0.400 0.032
FORS1.2002-01-15T08:03:11.110.fits | 110103 | 1.400 1.083   | 0.80 0.74   |  90.0 130.2   | 0.400 0.032
FORS1.2002-01-15T08:09:36.810.fits | 110103 | 1.400 1.076   | 0.80 0.91 A |  90.0 130.3   | 0.400 0.033
FORS1.2002-01-15T08:15:40.484.fits | 110103 | 1.400 1.069   | 0.80 0.93 A |  90.0 130.3   | 0.400 0.033
FORS1.2002-01-15T08:21:40.361.fits | 110103 | 1.400 1.064   | 0.80 0.82   |  90.0 130.4   | 0.400 0.033
FORS1.2002-01-15T08:27:46.459.fits | 110103 | 1.400 1.059   | 0.80 1.14 A |  90.0 130.4   | 0.400 0.033
FORS1.2002-01-15T08:33:50.804.fits | 110103 | 1.400 1.054   | 0.80 1.25 A |  90.0 130.5   | 0.400 0.033
FORS1.2002-01-15T08:39:56.931.fits | 110103 | 1.400 1.051   | 0.80 1.40 A |  90.0 130.6   | 0.400 0.034
FORS1.2002-01-20T05:53:58.191.fits | 110103 | 1.400 1.403   | 0.80 0.92 A |  90.0 166.0   | 0.400 0.355
FORS1.2002-01-20T06:02:25.362.fits | 110103 | 1.400 1.360   | 0.80 1.04 A |  90.0 166.0   | 0.400 0.355
FORS1.2002-01-20T07:08:31.105.fits | 110103 | 1.400 1.142   | 0.80 0.90 A |  90.0 165.5   | 0.400 0.361
FORS1.2002-01-20T07:14:56.780.fits | 110103 | 1.400 1.129   | 0.80 0.99 A |  90.0 165.4   | 0.400 0.361
FORS1.2002-01-20T07:20:57.255.fits | 110103 | 1.400 1.118   | 0.80 0.82   |  90.0 165.4   | 0.400 0.362
FORS1.2002-03-13T05:37:26.067.fits | 110103 | 1.400 1.048   | 0.80 0.89 A |  90.0 156.5   | 0.400 0.008
FORS1.2002-03-13T05:44:59.764.fits | 110103 | 1.400 1.050   | 0.80 0.85   |  90.0 156.5   | 0.400 0.008
FORS1.2002-03-13T05:51:06.845.fits | 110103 | 1.400 1.053   | 0.80 0.89 A |  90.0 156.6   | 0.400 0.007
FORS1.2002-03-13T05:57:29.733.fits | 110103 | 1.400 1.058   | 0.80 0.92 A |  90.0 156.6   | 0.400 0.007
FORS1.2002-03-13T06:03:31.677.fits | 110103 | 1.400 1.062   | 0.80 1.04 A |  90.0 156.7   | 0.400 0.007
FORS1.2002-03-13T06:09:35.097.fits | 110103 | 1.400 1.067   | 0.80 1.25 A |  90.0 156.8   | 0.400 0.007
FORS1.2002-03-13T06:15:38.324.fits | 110103 | 1.400 1.073   | 0.80 1.19 A |  90.0 156.8   | 0.400 0.007
FORS1.2002-03-13T06:21:38.719.fits | 110103 | 1.400 1.080   | 0.80 1.24 A |  90.0 156.9   | 0.400 0.007
FORS1.2002-03-13T06:27:38.904.fits | 110103 | 1.400 1.087   | 0.80 1.17 A |  90.0 156.9   | 0.400 0.007
FORS1.2002-03-13T06:33:37.420.fits | 110103 | 1.400 1.096   | 0.80 1.08 A |  90.0 157.0   | 0.400 0.007
FORS1.2002-01-21T06:53:19.727.fits | 110104 | 1.200 1.158   | 0.80 0.61   |  90.0 156.4   | 0.000 0.452 A
FORS1.2002-01-21T07:08:26.365.fits | 110104 | 1.200 1.125   | 0.80 0.73   |  90.0 156.2   | 0.000 0.453 A
FORS1.2002-01-21T07:23:33.445.fits | 110104 | 1.200 1.099   | 0.80 0.75   |  90.0 156.1   | 0.000 0.454 A
FORS1.2002-01-21T07:38:39.330.fits | 110104 | 1.200 1.079   | 0.80 0.66   |  90.0 155.9   | 0.000 0.456 A
FORS1.2002-02-10T05:48:04.811.fits | 110105 | 1.200 1.129   | 0.80 0.75   |  90.0 113.9   | 0.000 0.039 A
FORS1.2002-02-10T06:03:10.996.fits | 110105 | 1.200 1.102   | 0.80 1.00 A |  90.0 114.1   | 0.000 0.038 A
FORS1.2002-02-10T06:18:18.357.fits | 110105 | 1.200 1.089   | 0.80 1.05 A |  90.0 114.2   | 0.000 0.038 A
FORS1.2002-02-10T06:37:29.941.fits | 110105 | 1.200 1.062   | 0.80 0.87   |  90.0 114.4   | 0.000 0.037 A
FORS1.2002-02-10T06:52:36.888.fits | 110105 | 1.200 1.054   | 0.80 0.88   |  90.0 114.6   | 0.000 0.037 A
FORS1.2002-02-19T07:13:34.829.fits | 110105 | 1.200 1.054   | 0.80 0.80   |  90.0 137.1   | 0.000 0.378 A
FORS1.2002-02-20T04:44:30.458.fits | 110105 | 1.200 1.185   | 0.80 0.92 A |  90.0 126.7   | 0.000 0.462 A
FORS1.2002-04-04T02:38:13.657.fits | 110105 | 1.200 1.098   | 0.80 0.57   |  90.0  94.2   | 0.000 0.548 A
FORS1.2002-04-04T02:53:28.332.fits | 110105 | 1.200 1.077   | 0.80 0.58   |  90.0  94.4   | 0.000 0.546 A
FORS1.2002-04-04T03:08:38.436.fits | 110105 | 1.200 1.062   | 0.80 0.66   |  90.0  94.5   | 0.000 0.545 A
FORS1.2002-04-04T03:24:36.987.fits | 110105 | 1.200 1.051   | 0.80 0.55   |  90.0  94.7   | 0.000 0.544 A
FORS1.2002-03-16T04:36:09.600.fits | 110106 | 1.200 1.054   | 0.80 0.81   |  90.0 162.6   | 0.000 0.040 A
FORS1.2002-03-16T04:51:17.987.fits | 110106 | 1.200 1.047   | 0.80 0.78   |  90.0 162.5   | 0.000 0.040 A

Apr 17, 02 11:42 Page 1/2

qc0_report.txt

Printed by FORS1 account

Wednesday April 17, 2002 1/2

/fors1/data/service/68.A-0617A/GEN_INFO/qc0_report.txt

FORS1.2002-03-16T05:06:23.094.fits | 110106 | 1.200 1.046   | 0.80 0.82   |  90.0 162.4   | 0.000 0.041 A
FORS1.2002-03-16T05:21:28.959.fits | 110106 | 1.200 1.048   | 0.80 0.85   |  90.0 162.2   | 0.000 0.042 A
FORS1.2002-03-15T06:01:50.106.fits | 110107 | 1.200 1.072   | 0.80 0.67   |  90.0 168.6   | 0.000 0.014 A
FORS1.2002-03-15T06:16:55.721.fits | 110107 | 1.200 1.090   | 0.80 0.71   |  90.0 168.5   | 0.000 0.014 A
FORS1.2002-03-15T06:32:03.180.fits | 110107 | 1.200 1.114   | 0.80 0.63   |  90.0 168.5   | 0.000 0.015 A
FORS1.2002-03-15T06:47:08.228.fits | 110107 | 1.200 1.143   | 0.80 0.71   |  90.0 168.4   | 0.000 0.015 A
FORS1.2002-03-16T05:37:34.562.fits | 110107 | 1.200 1.055   | 0.80 0.85   |  90.0 162.0   | 0.000 0.042 A
FORS1.2002-03-16T05:52:40.069.fits | 110107 | 1.200 1.066   | 0.80 0.90 A |  90.0 161.9   | 0.000 0.043 A
FORS1.2002-03-16T06:07:47.608.fits | 110107 | 1.200 1.083   | 0.80 0.97 A |  90.0 161.7   | 0.000 0.043 A
FORS1.2002-03-16T06:22:53.302.fits | 110107 | 1.200 1.105   | 0.80 0.91 A |  90.0 161.6   | 0.000 0.044 A
FORS1.2002-03-15T07:06:31.575.fits | 110108 | 1.200 1.190   | 0.80 1.00 A |  90.0 168.3   | 0.000 0.015 A
FORS1.2002-03-15T07:21:43.298.fits | 110108 | 1.200 1.236   | 0.80 1.05 A |  90.0 168.2   | 0.000 0.016 A
FORS1.2002-03-15T07:36:54.247.fits | 110108 | 1.200 1.291   | 0.80 1.00 A |  90.0 168.2   | 0.000 0.016 A
FORS1.2002-03-15T07:52:06.523.fits | 110108 | 1.200 1.356 A | 0.80 0.79   |  90.0 168.1   | 0.000 0.016 A
FORS1.2002-03-16T06:38:27.595.fits | 110108 | 1.200 1.132   | 0.80 0.97 A |  90.0 161.4   | 0.000 0.044 A
FORS1.2002-03-16T06:53:38.118.fits | 110108 | 1.200 1.165   | 0.80 0.93 A |  90.0 161.3   | 0.000 0.045 A
FORS1.2002-03-16T07:08:44.803.fits | 110108 | 1.200 1.206   | 0.80 0.81   |  90.0 161.1   | 0.000 0.046 A
FORS1.2002-03-16T07:23:50.613.fits | 110108 | 1.200 1.255   | 0.80 0.74   |  90.0 161.0   | 0.000 0.046 A
FORS1.2002-02-11T06:57:27.878.fits | 110109 | 1.300 1.049   | 0.80 0.47   |  90.0 126.4   | 0.200 0.010
FORS1.2002-02-11T07:06:44.785.fits | 110109 | 1.300 1.046   | 0.80 0.48   |  90.0 126.5   | 0.200 0.010
FORS1.2002-02-11T07:16:01.842.fits | 110109 | 1.300 1.045   | 0.80 0.48   |  90.0 126.6   | 0.200 0.009
FORS1.2002-02-11T07:25:21.772.fits | 110109 | 1.300 1.046   | 0.80 0.57   |  90.0 126.7   | 0.200 0.009
FORS1.2002-02-11T07:34:42.055.fits | 110109 | 1.300 1.048   | 0.80 0.55   |  90.0 126.8   | 0.200 0.009
FORS1.2002-02-11T07:44:02.308.fits | 110109 | 1.300 1.051   | 0.80 0.58   |  90.0 126.8   | 0.200 0.009
FORS1.2002-02-11T07:53:18.997.fits | 110109 | 1.300 1.057   | 0.80 0.61   |  90.0 126.9   | 0.200 0.009
FORS1.2002-02-11T08:02:53.861.fits | 110110 | 1.300 1.064   | 0.80 0.60   |  90.0 127.0   | 0.200 0.009
FORS1.2002-02-11T08:12:10.185.fits | 110110 | 1.300 1.073   | 0.80 0.58   |  90.0 127.1   | 0.200 0.009
FORS1.2002-02-11T08:21:27.208.fits | 110110 | 1.300 1.084   | 0.80 0.63   |  90.0 127.2   | 0.200 0.009
FORS1.2002-02-11T08:30:47.473.fits | 110110 | 1.300 1.097   | 0.80 0.59   |  90.0 127.3   | 0.200 0.008
FORS1.2002-02-11T08:40:07.097.fits | 110110 | 1.300 1.111   | 0.80 0.57   |  90.0 127.4   | 0.200 0.008
FORS1.2002-02-11T08:49:27.624.fits | 110110 | 1.300 1.128   | 0.80 0.55   |  90.0 127.4   | 0.200 0.008
FORS1.2002-02-11T08:58:44.161.fits | 110110 | 1.300 1.148   | 0.80 0.58   |  90.0 127.5   | 0.200 0.008
FORS1.2002-01-16T06:30:34.275.fits | 110111 | 1.200 1.283   | 1.00 0.85   |  90.0 140.7   | 0.000 0.070 A
FORS1.2002-01-16T06:48:53.358.fits | 110111 | 1.200 1.232   | 1.00 1.19 A |  90.0 140.9   | 0.000 0.071 A
FORS1.2002-01-16T08:37:27.356.fits | 110113 | 1.500 1.355   | 1.00 1.16 A |  90.0 130.7   | 0.000 0.076 A
FORS1.2002-01-16T06:17:44.829.fits | 110114 | 1.500 1.113   | 1.00 0.70   |  90.0 163.2   | 0.000 0.069 A
FORS1.2002-01-22T06:33:44.076.fits | 110115 | 1.300 1.204   | 0.80 0.87   |  90.0 145.6   | 0.000 0.546 A
FORS1.2002-01-22T06:44:20.393.fits | 110115 | 1.300 1.175   | 0.80 0.72   |  90.0 145.4   | 0.000 0.547 A
FORS1.2002-01-22T06:54:54.389.fits | 110115 | 1.300 1.150   | 0.80 0.66   |  90.0 145.3   | 0.000 0.548 A
FORS1.2002-01-22T07:05:28.122.fits | 110115 | 1.300 1.128   | 0.80 0.63   |  90.0 145.2   | 0.000 0.549 A
FORS1.2002-01-22T07:16:02.575.fits | 110115 | 1.300 1.109   | 0.80 0.61   |  90.0 145.1   | 0.000 0.550 A
FORS1.2002-01-22T07:26:34.484.fits | 110115 | 1.300 1.092   | 0.80 0.57   |  90.0 145.0   | 0.000 0.551 A
FORS1.2002-02-12T06:26:18.866.fits | 110116 | 1.400 1.069   | 0.80 0.93 A |  90.0 137.6   | 0.400 0.001
FORS1.2002-02-12T06:32:21.900.fits | 110116 | 1.400 1.063   | 0.80 0.93 A |  90.0 137.7   | 0.400 0.001
FORS1.2002-02-12T06:38:44.588.fits | 110116 | 1.400 1.058   | 0.80 0.80   |  90.0 137.7   | 0.400 0.001
FORS1.2002-02-12T06:44:48.832.fits | 110116 | 1.400 1.054   | 0.80 0.51   |  90.0 137.8   | 0.400 0.001
FORS1.2002-02-12T06:50:59.936.fits | 110116 | 1.400 1.051   | 0.80 0.51   |  90.0 137.9   | 0.400 0.001
FORS1.2002-02-12T06:57:07.643.fits | 110116 | 1.400 1.048   | 0.80 0.53   |  90.0 137.9   | 0.400 0.001
FORS1.2002-02-12T07:03:11.636.fits | 110116 | 1.400 1.046   | 0.80 0.53   |  90.0 138.0   | 0.400 0.001
FORS1.2002-02-12T07:09:14.703.fits | 110116 | 1.400 1.046   | 0.80 0.56   |  90.0 138.0   | 0.400 0.001
FORS1.2002-02-12T07:15:18.648.fits | 110116 | 1.400 1.045   | 0.80 0.65   |  90.0 138.1   | 0.400 0.001
FORS1.2002-02-12T07:21:20.733.fits | 110116 | 1.400 1.046   | 0.80 0.66   |  90.0 138.2   | 0.400 0.001
FORS1.2002-01-21T05:51:30.104.fits | 110117 | 1.200 1.373 A | 0.80 0.59   |  90.0 156.9   | 0.000 0.447 A
FORS1.2002-01-21T06:06:37.342.fits | 110117 | 1.200 1.304   | 0.80 0.63   |  90.0 156.8   | 0.000 0.448 A
FORS1.2002-01-21T06:21:46.147.fits | 110117 | 1.200 1.247   | 0.80 0.68   |  90.0 156.7   | 0.000 0.449 A
FORS1.2002-01-21T06:36:55.363.fits | 110117 | 1.200 1.200   | 0.80 0.69   |  90.0 156.5   | 0.000 0.450 A
FORS1.2002-02-12T07:28:18.027.fits | 110118 | 1.300 1.047   | 0.80 0.75   |  90.0 138.2   | 0.200 0.001
FORS1.2002-02-12T07:37:38.362.fits | 110118 | 1.300 1.050   | 0.80 0.71   |  90.0 138.3   | 0.200 0.001
FORS1.2002-02-12T07:47:13.863.fits | 110118 | 1.300 1.056   | 0.80 0.78   |  90.0 138.4   | 0.200 0.001
FORS1.2002-02-12T07:56:46.717.fits | 110118 | 1.300 1.062   | 0.80 0.81   |  90.0 138.5   | 0.200 0.001
FORS1.2002-02-12T08:08:43.124.fits | 110118 | 1.300 1.073   | 0.80 0.61   |  90.0 138.6   | 0.200 0.001
FORS1.2002-02-12T08:18:06.085.fits | 110118 | 1.300 1.085   | 0.80 0.62   |  90.0 138.7   | 0.200 0.001
FORS1.2002-02-12T08:27:37.396.fits | 110118 | 1.300 1.097   | 0.80 0.66   |  90.0 138.8   | 0.200 0.001

Apr 17, 02 11:42 Page 2/2

qc0_report.txt

Printed by FORS1 account

Wednesday April 17, 2002 2/2

/fors1/data/service/68.A-0617A/GEN_INFO/qc0_report.txt