PG 1047+003

RA = 10:50:08 DEC = -00:01:04 (2000.0)

V B-V U-B V-R R-I V-I PG 1047+003 13.474 -0.290 -1.121 -0.132 -0.162 -0.295 A 13.512 0.688 0.168 0.422 0.418 0.840 B 14.751 0.679 0.172 0.391 0.371 0.764 C 12.453 0.607 -0.019 0.378 0.358 0.737