PG 1657+078

RA = 16:59:32 DEC = 07:42:52 (2000.0)

V B-V U-B V-R R-I V-I PG 1657+078 15.015 -0.149 -0.940 -0.063 -0.033 -0.100 A 14.033 1.069 0.730 0.573 0.539 1.113 B 14.721 0.708 0.065 0.417 0.420 0.838 C 15.225 0.840 0.385 0.521 0.444 0.967