SA 101

RA = 09:57:36 DEC = -00:18:50 (2000.0)

V B-V U-B V-R R-I V-I 341 14.342 0.575 0.059 0.332 0.309 0.641 342 15.556 0.529 -0.065 0.339 0.419 0.758 427 14.964 0.805 0.321 0.484 0.369 0.854 429 13.496 0.980 0.782 0.617 0.526 1.143 431 13.684 1.246 1.144 0.808 0.708 1.517 L6 16.497 0.711 0.183 0.445 0.583 1.024