SA 110

RA = 18:42:52 DEC = 00:06:28 (2000.0)

V B-V U-B V-R R-I V-I 266 12.018 0.889 0.411 0.538 0.577 1.111 360 14.618 1.197 0.539 0.715 0.717 1.432 361 12.425 0.632 0.035 0.361 0.348 0.709 362 15.693 1.333 3.919 0.918 0.885 1.803 L1 16.252 1.752 2.953 1.066 0.992 2.058 364 13.615 1.133 1.095 0.697 0.585 1.281 365 13.470 2.261 1.895 1.360 1.270 2.631