SA 98

RA = 06:52:14 DEC = -00:19:50 (2000.0)

V B-V U-B V-R R-I V-I 646 15.839 1.060 1.426 0.583 0.504 1.090 650 12.271 0.157 0.110 0.080 0.086 0.166 652 14.817 0.611 0.126 0.276 0.339 0.618 653 9.539 -0.004 -0.099 0.009 0.008 0.017 670 11.930 1.356 1.313 0.723 0.653 1.375 671 13.385 0.968 0.719 0.575 0.494 1.071 675 13.398 1.909 1.936 1.082 1.002 2.085 676 13.068 1.146 0.666 0.683 0.673 1.352 L5 17.800 1.900 -0.100 3.100 2.600 5.800 682 13.749 0.632 0.098 0.366 0.352 0.717 685 11.954 0.463 0.096 0.290 0.280 0.570