Current Status

Guidelines defined

. Data Interface Control document

Caveats:

. WCS — change to the new FITS standard . new keyword classes . generic dictionary — use released dictionaries

Environment defined

. dictionaries for telescope, detectors, observations, templates, archive exist

Use similar instruments as examples:

VIMOS $ FORS CONICA $ ISAAC NIRMOS $ ISAAC,FORS GIRAFE $ FORS SINFONI $ ISAAC,CONICA CRIRES $ UVES