ESO VLT Software Workshop, April 21-23 1999

ISAAC Installation options

• Real mode version installation • Simulation mode version installation • SW retrieval from archive and following SW build • Technical CCD (Slit viewing camera) installation • ICS LCU installation • RTAP installation • Create a TAR file with modules located in the CMM archive • Installation from TAR file

ESO VLT Software Workshop, April 21-23 1999

Installation Library Facilities

• Logging: full log, error log and progress log • Command line argument handling • Archive handling: either CMM archive or TAR file • Short FITS file handling • Local and remote build of SW modules • Installation of RTAP environment • Installation of LCU environment • Installation of Technical CCD • Creation of INS_ROOT and INTROOT directories • etc.

ESO VLT Software Workshop, April 21-23 1999

Implementation:

• Programming language: Tcl/Tk • Installation configuration based on short FITS files (PAF) • A script containing the specific installation SW for ISAAC • A library script containing common VLT installation SW

ESO VLT Software Workshop, April 21-23 1999

Purpose of the isinst Installation Tool:

• Install the ISAAC SW non-interactively • To provide a basic common installation SW

Advantages:

• Less work to do an installation • Minimizes the risk of installation errors • Less knowledge of the instrument itself is required • Less knowledge of the instrument SW modules is required • Minimizes installation duration