dss.fits - dss25617

0 100 200 300 400

0

100

200

300

400

1965 2237 2510 2782 3055 3327

z1=1965.00 z2=3354.88 ztrans=linear Con=1.00 Brt=0.50 cmap=Grayscale ncolors=204

NOAO/IRAF iraf@achst Wed Oct 7 15:41:55 1998