Erratum: A bright early-type star in the halo of NGC 253: runaway or in-situ formation?

F. Comerón^1, A.E. Gómez^2 and J. Torra^3

1 European Southern Observatory, Karl-Schwarzschild-Str. 2, D-85748 Garching bei München, Germany 2 Observatoire de Paris-Meudon, GEPI, UMR 8111 du CNRS, F-92195 Meudon, France 3 Departament d’Astronomia i Meteorologia, Universitat de Barcelona, Av. Diagonal 647, E-08028 Barcelona, Spain

The coordinates of the object discussed in that paper (A&A, 400, 137) are erroneously given. The actual coordinates are α(2000) = 0^h48^m05.3^s, δ(2000) = −25^∘17^′45^{′′}. Accordingly, the correct denomination of the object following IAU nomenclature is J004805.3-251745. The object is correctly identified in Figure 2 of the paper.

The authors wish to express their gratitude to Dr. Ralf Scholz for kindly having pointed out the mistake to them.