MIDAS version: 02FEB

Mo, 02 Jun 2003 16:15:52

Frame : N926.bdf Identifier : ITT-table : neg.itt LUT-table : heat Coordinates : 256.086, 51.7373 : 255.992, 51.8312 Pixels : 1, 1 : 451, 451 Cut values : -20, 60 User : pmoller

ESO-MIDAS(02FEB); Mo, 02 Jun 2003 16:15:52

256.086 255.992

51.7373

51.8312