MIDAS version: 02FEB

We, 29 Oct 2003 17:02:31

Frame : smo2.bdf Identifier : ITT-table : neg.itt LUT-table : heat Coordinates : 394, 394 : 901, 901 Pixels : 1, 1 : 512, 512 Cut values : -6, 8 User : pmoller

ESO-MIDAS(02FEB); We, 29 Oct 2003 17:02:31

394 901

394901