TABLE 1 Observing Run information

Telescope Å/ pixel Approx. Range(Å)

KPNO 2.1m 2.4 3700−9000 ESO 2.2m 5.2 2500−12000 ESO 3.6m 6.3 3700−6900 (B300 grism) 6.3 6700−10000 (R300 grism) CTIO 1.5m 5.4 3600−10000 CTIO 4.0m 1.2 3800−7300 MMT 2.0 3800-9000 Lick 3m 1.8 3700-8300