0

5

10

15 Cygnus A East

a [Fe VII]

[Fe XI]

IS

4000 5000 6000 7000 8000 0

.5

1

1.5 c

x

Cygnus A West

b [Fe VII]

[Fe XI]

IS

4000 5000 6000 7000 8000 d