Grey scale flux range= 8.0 100.0 MilliCOUNTS

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

10 19 49.2

49.1

49.0

48.9

48.8

48.7

48.6

48.5

-22 19 59.0

59.5

60.0

20 00.5

01.0

01.5

02.0

02.5

03.0