MRC-0406 0406S_SP.IMAP.1

Plot file version 7 created 06-AUG-1998 14:56:53

Grey scale flux range= 2.0 70.0 Peak contour flux = -6.5944E+01 Levs = 2.2500E+00 * ( 1.000, 1.250, 1.580, 2.000, 2.510, 3.170, 4.000, 5.000, 6.340, 8.000, 10.00, 12.69, 16.00, 20.15, 25.39, 32.00, 40.30, 51.00, 64.00)

Distance (arcsec)

Wavelength (Angstrom)

4130 4140 4150 4160 4170 4180 4190

4

2

0

-2

-4

-6

-8