QC0 report (airmass, seeing, moon distance, fractional lunar illumination) for FORS2 programme 68.A-0459B
=============================================================================================================

This list compares the QC0 parameters specified in your OBs with those actually measured on Paranal during observations.

The alarm flag is set to ’A’ if a constraint has been nominally violated.

The columns have the following meaning:

targt: specified in OB; measd: measured during observation
F:  flag (A = alarm)
units: seeing in arcs; moon distance in degrees; FLI in %

filename                           | OB_ID  | AIRM          | SEEING      | MOON_DIST     | FLI
                                   |        | targt measd F | trgt msd  F | targt measd F | targt measd F
---------------------------------------------------------------------------------------------------------
FORS2.2002-02-05T05:37:45.190.fits | 111336 | 2.000 1.401   | 1.20 2.29 A |  90.0  40.0 A | 0.300 0.422 A
FORS2.2002-02-05T05:39:41.721.fits | 111336 | 2.000 1.391   | 1.20 2.29 A |  90.0  40.0 A | 0.300 0.422 A
FORS2.2002-02-05T05:41:37.762.fits | 111336 | 2.000 1.382   | 1.20 2.37 A |  90.0  40.0 A | 0.300 0.422 A
FORS2.2002-02-06T05:50:26.686.fits | 111336 | 2.000 1.322   | 1.20 1.31   |  90.0  53.1 A | 0.300 0.318
FORS2.2002-02-06T05:52:22.550.fits | 111336 | 2.000 1.313   | 1.20 1.59 A |  90.0  53.1 A | 0.300 0.318
FORS2.2002-02-06T05:54:19.163.fits | 111336 | 2.000 1.305   | 1.20 1.64 A |  90.0  53.1 A | 0.300 0.318
FORS2.2002-02-10T05:19:31.121.fits | 111336 | 2.000 1.395   | 1.20 1.04   |  90.0 102.4   | 0.300 0.040
FORS2.2002-02-10T05:21:26.881.fits | 111336 | 2.000 1.385   | 1.20 1.07   |  90.0 102.4   | 0.300 0.040
FORS2.2002-02-10T05:23:24.115.fits | 111336 | 2.000 1.375   | 1.20 1.07   |  90.0 102.4   | 0.300 0.040
FORS2.2002-02-05T05:20:04.122.fits | 111337 | 2.000 1.507   | 1.20 1.68 A |  90.0  39.9 A | 0.300 0.423 A
FORS2.2002-02-05T05:22:00.646.fits | 111337 | 2.000 1.493   | 1.20 1.72 A |  90.0  39.9 A | 0.300 0.423 A
FORS2.2002-02-05T05:23:57.831.fits | 111337 | 2.000 1.481   | 1.20 1.58 A |  90.0  39.9 A | 0.300 0.423 A
FORS2.2002-02-05T05:26:11.604.fits | 111337 | 2.000 1.467   | 1.20 1.59 A |  90.0  39.9 A | 0.300 0.423 A
FORS2.2002-02-05T05:28:08.134.fits | 111337 | 2.000 1.456   | 1.20 2.06 A |  90.0  39.9 A | 0.300 0.423 A
FORS2.2002-02-05T05:30:05.053.fits | 111337 | 2.000 1.444   | 1.20 1.72 A |  90.0  39.9 A | 0.300 0.422 A
FORS2.2002-02-06T06:00:37.916.fits | 111337 | 2.000 1.280   | 1.20 1.53 A |  90.0  53.2 A | 0.300 0.317
FORS2.2002-02-06T06:02:34.398.fits | 111337 | 2.000 1.271   | 1.20 1.28   |  90.0  53.2 A | 0.300 0.317
FORS2.2002-02-06T06:04:30.497.fits | 111337 | 2.000 1.264   | 1.20 1.58 A |  90.0  53.3 A | 0.300 0.317
FORS2.2002-02-10T05:28:46.556.fits | 111337 | 2.000 1.348   | 1.20 0.73   |  90.0 102.6   | 0.300 0.040
FORS2.2002-02-10T05:30:42.869.fits | 111337 | 2.000 1.339   | 1.20 0.65   |  90.0 102.6   | 0.300 0.039
FORS2.2002-02-10T05:32:38.850.fits | 111337 | 2.000 1.330   | 1.20 0.69   |  90.0 102.6   | 0.300 0.039
FORS2.2002-02-06T06:16:26.010.fits | 111338 | 2.000 1.215   | 1.20 1.98 A |  90.0  53.4 A | 0.300 0.316
FORS2.2002-02-10T05:47:51.196.fits | 111338 | 2.000 1.259   | 1.20 0.74   |  90.0 102.8   | 0.300 0.039

Feb 19, 02 17:14 Page 1/1

qc0_report.txt

Printed by FORS2 account

Tuesday February 19, 2002 1/1

/fors2/data/service/68.A-0459B/GEN_INFO/qc0_report.txt