Dec 4 2001 09:49 Page �

qc0_example.txt

 QC0 report (airmass, seeing, moon distance, fractional lunar illumination) for VLT/ANTU programme 67.A-5121K
 =============================================================================================================

 This list compares the QC0 parameters specified in your OBs with those actually measured on Paranal during observations.

 The alarm flag is set to ’A’ if a constraint has been nominally violated.

 The columns have the following meaning:

 tgt: specified in OB; msd: measured during observation
 F:  flag (V = verified, A = alarm)
 units: seeing in arcs; moon distance in degrees; FLI in %

 Note for infrared observations: the measured seeing listed in the table is taken in the optical V band.
                                 The actual infrared seeing is lower than that.

 -----------------------------------+--------+---------------+-------------+---------------+--------------
 filename                           |OB_ID   | AIRM          | SEEING      |  MOON_DIST    | FLI
                                    |        | tgt   msd   F | tgt  msd  F |  tgt   msd  F | tgt   msd   F
 -----------------------------------+--------+---------------+-------------+---------------+--------------
 ISAAC.2001-09-05T01:05:14.234.fits | 113316 | 1.400 1.533 V | 0.60 0.71 A |  30.0  32.5 V | 1.000 0.953 V
 ISAAC.2001-09-05T01:07:39.571.fits | 113316 | 1.400 1.517 V | 0.60 0.72 A |  30.0  32.5 V | 1.000 0.953 V
 ISAAC.2001-09-05T01:10:04.696.fits | 113316 | 1.400 1.502 V | 0.60 0.71 A |  30.0  32.5 V | 1.000 0.953 V
 ISAAC.2001-09-05T01:12:29.321.fits | 113316 | 1.400 1.487 V | 0.60 0.85 A |  30.0  32.6 V | 1.000 0.953 V
 ISAAC.2001-09-05T01:14:54.564.fits | 113316 | 1.400 1.472 V | 0.60 0.83 A |  30.0  32.6 V | 1.000 0.953 V
 ISAAC.2001-09-05T01:17:20.131.fits | 113316 | 1.400 1.459 V | 0.60 0.83 A |  30.0  32.6 V | 1.000 0.953 V
 ISAAC.2001-09-05T01:19:45.386.fits | 113316 | 1.400 1.445 V | 0.60 0.87 A |  30.0  32.6 V | 1.000 0.953 V
 -----------------------------------+--------+---------------+-------------+---------------+--------------
 ISAAC.2001-09-08T04:16:38.130.fits | 113316 | 1.400 1.086 V | 0.60 0.00 V |  30.0  69.1 V | 1.000 0.751 V
 ISAAC.2001-09-08T04:19:04.009.fits | 113316 | 1.400 1.088 V | 0.60 0.00 V |  30.0  69.1 V | 1.000 0.751 V
 ISAAC.2001-09-08T04:21:30.584.fits | 113316 | 1.400 1.089 V | 0.60 0.00 V |  30.0  69.2 V | 1.000 0.751 V
 ISAAC.2001-09-08T04:23:53.338.fits | 113316 | 1.400 1.090 V | 0.60 0.00 V |  30.0  69.2 V | 1.000 0.751 V
 ISAAC.2001-09-08T04:26:17.741.fits | 113316 | 1.400 1.092 V | 0.60 0.00 V |  30.0  69.2 V | 1.000 0.751 V
 ISAAC.2001-09-08T04:28:43.222.fits | 113316 | 1.400 1.094 V | 0.60 0.00 V |  30.0  69.2 V | 1.000 0.751 V
 ISAAC.2001-09-08T04:31:08.753.fits | 113316 | 1.400 1.095 V | 0.60 0.00 V |  30.0  69.2 V | 1.000 0.751 V
 ISAAC.2001-09-08T04:33:33.640.fits | 113316 | 1.400 1.097 V | 0.60 0.00 V |  30.0  69.2 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:35:58.079.fits | 113316 | 1.400 1.099 V | 0.60 0.00 V |  30.0  69.2 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:38:22.311.fits | 113316 | 1.400 1.101 V | 0.60 0.00 V |  30.0  69.3 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:40:47.557.fits | 113316 | 1.400 1.103 V | 0.60 0.00 V |  30.0  69.3 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:43:12.253.fits | 113316 | 1.400 1.105 V | 0.60 0.00 V |  30.0  69.3 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:45:36.981.fits | 113316 | 1.400 1.108 V | 0.60 0.00 V |  30.0  69.3 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:48:02.570.fits | 113316 | 1.400 1.110 V | 0.60 0.00 V |  30.0  69.3 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:50:29.329.fits | 113316 | 1.400 1.113 V | 0.60 0.00 V |  30.0  69.3 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:52:54.357.fits | 113316 | 1.400 1.117 V | 0.60 0.00 V |  30.0  69.4 V | 1.000 0.750 V
 ISAAC.2001-09-08T04:55:18.372.fits | 113316 | 1.400 1.120 V | 0.60 0.00 V |  30.0  69.4 V | 1.000 0.749 V
 ISAAC.2001-09-08T04:57:44.480.fits | 113316 | 1.400 1.122 V | 0.60 0.00 V |  30.0  69.4 V | 1.000 0.749 V
 ISAAC.2001-09-08T05:00:08.466.fits | 113316 | 1.400 1.126 V | 0.60 0.00 V |  30.0  69.4 V | 1.000 0.749 V
 ISAAC.2001-09-08T05:02:34.092.fits | 113316 | 1.400 1.130 V | 0.60 0.91 A |  30.0  69.4 V | 1.000 0.749 V
 ISAAC.2001-09-08T05:04:57.919.fits | 113316 | 1.400 1.133 V | 0.60 0.91 A |  30.0  69.4 V | 1.000 0.749 V
 ISAAC.2001-09-08T05:07:22.335.fits | 113316 | 1.400 1.137 V | 0.60 0.90 A |  30.0  69.4 V | 1.000 0.749 V
 ISAAC.2001-09-08T05:09:46.820.fits | 113316 | 1.400 1.141 V | 0.60 0.84 A |  30.0  69.5 V | 1.000 0.749 V
 ISAAC.2001-09-08T05:12:13.455.fits | 113316 | 1.400 1.145 V | 0.60 0.84 A |  30.0  69.5 V | 1.000 0.749 V
 ISAAC.2001-09-08T05:14:39.129.fits | 113316 | 1.400 1.149 V | 0.60 0.83 A |  30.0  69.5 V | 1.000 0.749 V
 -----------------------------------+--------+---------------+-------------+---------------+--------------

qc0_example.txt

Printed by whummel from web4

Dec 4 2001 09:49 Page �

qc0_example.txt

 ISAAC.2001-09-13T01:18:11.522.fits | 113315 | 1.400 1.307 V | 0.60 1.14 A |  30.0 131.7 V | 1.000 0.258 V
 ISAAC.2001-09-13T01:20:37.800.fits | 113315 | 1.400 1.298 V | 0.60 1.16 A |  30.0 131.7 V | 1.000 0.257 V
 ISAAC.2001-09-13T01:23:02.552.fits | 113315 | 1.400 1.289 V | 0.60 1.20 A |  30.0 131.7 V | 1.000 0.257 V
 ISAAC.2001-09-13T01:25:27.900.fits | 113315 | 1.400 1.280 V | 0.60 1.24 A |  30.0 131.8 V | 1.000 0.257 V
 ISAAC.2001-09-13T01:27:51.966.fits | 113315 | 1.400 1.272 V | 0.60 1.25 A |  30.0 131.8 V | 1.000 0.257 V
 ISAAC.2001-09-13T01:30:16.092.fits | 113315 | 1.400 1.263 V | 0.60 1.29 A |  30.0 131.8 V | 1.000 0.256 V
 ISAAC.2001-09-13T01:32:40.366.fits | 113315 | 1.400 1.256 V | 0.60 1.22 A |  30.0 131.9 V | 1.000 0.256 V
 ISAAC.2001-09-13T01:35:06.478.fits | 113315 | 1.400 1.248 V | 0.60 1.18 A |  30.0 131.9 V | 1.000 0.256 V
 ISAAC.2001-09-13T01:37:31.569.fits | 113315 | 1.400 1.241 V | 0.60 1.06 A |  30.0 131.9 V | 1.000 0.256 V
 ISAAC.2001-09-13T01:39:55.495.fits | 113315 | 1.400 1.234 V | 0.60 0.91 A |  30.0 132.0 V | 1.000 0.255 V
 ISAAC.2001-09-13T01:42:20.411.fits | 113315 | 1.400 1.227 V | 0.60 0.93 A |  30.0 132.0 V | 1.000 0.255 V
 ISAAC.2001-09-13T01:44:46.804.fits | 113315 | 1.400 1.220 V | 0.60 0.82 A |  30.0 132.0 V | 1.000 0.255 V
 ISAAC.2001-09-13T01:47:11.918.fits | 113315 | 1.400 1.214 V | 0.60 0.95 A |  30.0 132.0 V | 1.000 0.255 V
 ISAAC.2001-09-13T01:49:35.996.fits | 113315 | 1.400 1.207 V | 0.60 0.91 A |  30.0 132.1 V | 1.000 0.255 V
 ISAAC.2001-09-13T01:52:01.932.fits | 113315 | 1.400 1.201 V | 0.60 0.92 A |  30.0 132.1 V | 1.000 0.254 V
 ISAAC.2001-09-13T01:54:26.418.fits | 113315 | 1.400 1.195 V | 0.60 0.97 A |  30.0 132.1 V | 1.000 0.254 V
 ISAAC.2001-09-13T01:56:51.967.fits | 113315 | 1.400 1.190 V | 0.60 0.95 A |  30.0 132.2 V | 1.000 0.254 V
 ISAAC.2001-09-13T01:59:16.831.fits | 113315 | 1.400 1.184 V | 0.60 1.08 A |  30.0 132.2 V | 1.000 0.254 V
 ISAAC.2001-09-13T02:01:43.122.fits | 113315 | 1.400 1.178 V | 0.60 1.13 A |  30.0 132.2 V | 1.000 0.253 V
 ISAAC.2001-09-13T02:04:09.308.fits | 113315 | 1.400 1.173 V | 0.60 1.31 A |  30.0 132.3 V | 1.000 0.253 V
 ISAAC.2001-09-13T02:06:34.609.fits | 113315 | 1.400 1.168 V | 0.60 1.21 A |  30.0 132.3 V | 1.000 0.253 V
 ISAAC.2001-09-13T02:08:58.463.fits | 113315 | 1.400 1.163 V | 0.60 1.37 A |  30.0 132.3 V | 1.000 0.253 V
 ISAAC.2001-09-13T02:11:24.794.fits | 113315 | 1.400 1.158 V | 0.60 1.36 A |  30.0 132.4 V | 1.000 0.252 V
 ISAAC.2001-09-13T02:13:48.586.fits | 113315 | 1.400 1.154 V | 0.60 1.38 A |  30.0 132.4 V | 1.000 0.252 V
 ISAAC.2001-09-13T02:16:14.790.fits | 113315 | 1.400 1.149 V | 0.60 1.35 A |  30.0 132.4 V | 1.000 0.252 V
 -----------------------------------+--------+---------------+-------------+---------------+--------------
 ISAAC.2001-09-18T03:00:22.978.fits | 113318 | 1.400 1.086 V | 0.60 0.47 V |  30.0 150.1 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:02:51.506.fits | 113318 | 1.400 1.085 V | 0.60 0.47 V |  30.0 150.0 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:05:20.726.fits | 113318 | 1.400 1.084 V | 0.60 0.48 V |  30.0 150.0 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:07:49.738.fits | 113318 | 1.400 1.084 V | 0.60 0.49 V |  30.0 150.0 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:10:18.519.fits | 113318 | 1.400 1.083 V | 0.60 0.49 V |  30.0 149.9 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:12:46.931.fits | 113318 | 1.400 1.083 V | 0.60 0.56 V |  30.0 149.9 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:15:14.138.fits | 113318 | 1.400 1.083 V | 0.60 0.56 V |  30.0 149.9 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:17:42.051.fits | 113318 | 1.400 1.083 V | 0.60 0.58 V |  30.0 149.8 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:20:11.203.fits | 113318 | 1.400 1.083 V | 0.60 0.54 V |  30.0 149.8 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:22:41.959.fits | 113318 | 1.400 1.083 V | 0.60 0.55 V |  30.0 149.8 V | 1.000 0.008 V
 ISAAC.2001-09-18T03:25:09.209.fits | 113318 | 1.400 1.084 V | 0.60 0.55 V |  30.0 149.7 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:27:37.197.fits | 113318 | 1.400 1.085 V | 0.60 0.58 V |  30.0 149.7 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:30:04.913.fits | 113318 | 1.400 1.085 V | 0.60 0.57 V |  30.0 149.7 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:32:33.593.fits | 113318 | 1.400 1.086 V | 0.60 0.51 V |  30.0 149.6 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:35:01.403.fits | 113318 | 1.400 1.086 V | 0.60 0.48 V |  30.0 149.6 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:37:30.912.fits | 113318 | 1.400 1.088 V | 0.60 0.53 V |  30.0 149.6 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:39:57.615.fits | 113318 | 1.400 1.089 V | 0.60 0.52 V |  30.0 149.6 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:42:25.023.fits | 113318 | 1.400 1.090 V | 0.60 0.50 V |  30.0 149.5 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:44:51.866.fits | 113318 | 1.400 1.092 V | 0.60 0.52 V |  30.0 149.5 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:47:21.445.fits | 113318 | 1.400 1.093 V | 0.60 0.48 V |  30.0 149.5 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:49:51.163.fits | 113318 | 1.400 1.095 V | 0.60 0.48 V |  30.0 149.4 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:52:19.177.fits | 113318 | 1.400 1.097 V | 0.60 0.49 V |  30.0 149.4 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:54:48.179.fits | 113318 | 1.400 1.099 V | 0.60 0.50 V |  30.0 149.4 V | 1.000 0.009 V
 ISAAC.2001-09-18T03:57:16.355.fits | 113318 | 1.400 1.101 V | 0.60 0.54 V |  30.0 149.3 V | 1.000 0.009 V
 ISAAC.2001-09-18T04:02:05.999.fits | 113317 | 1.400 1.105 V | 0.60 0.49 V |  30.0 149.3 V | 1.000 0.009 V
 ISAAC.2001-09-18T04:04:31.841.fits | 113317 | 1.400 1.107 V | 0.60 0.56 V |  30.0 149.2 V | 1.000 0.009 V
 ISAAC.2001-09-18T04:06:56.866.fits | 113317 | 1.400 1.110 V | 0.60 0.54 V |  30.0 149.2 V | 1.000 0.009 V
 ISAAC.2001-09-18T04:09:23.610.fits | 113317 | 1.400 1.113 V | 0.60 0.51 V |  30.0 149.2 V | 1.000 0.009 V
 ISAAC.2001-09-18T04:11:49.915.fits | 113317 | 1.400 1.115 V | 0.60 0.48 V |  30.0 149.1 V | 1.000 0.009 V

qc0_example.txt

Printed by whummel from web4

Dec 4 2001 09:49 Page �

qc0_example.txt

 ISAAC.2001-09-18T04:14:14.469.fits | 113317 | 1.400 1.118 V | 0.60 0.52 V |  30.0 149.1 V | 1.000 0.009 V
 ISAAC.2001-09-18T04:16:40.892.fits | 113317 | 1.400 1.122 V | 0.60 0.52 V |  30.0 149.1 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:19:07.251.fits | 113317 | 1.400 1.125 V | 0.60 0.47 V |  30.0 149.0 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:21:33.254.fits | 113317 | 1.400 1.128 V | 0.60 0.47 V |  30.0 149.0 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:23:58.275.fits | 113317 | 1.400 1.132 V | 0.60 0.56 V |  30.0 149.0 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:26:22.822.fits | 113317 | 1.400 1.135 V | 0.60 0.52 V |  30.0 148.9 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:28:49.242.fits | 113317 | 1.400 1.140 V | 0.60 0.52 V |  30.0 148.9 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:31:13.850.fits | 113317 | 1.400 1.143 V | 0.60 0.52 V |  30.0 148.9 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:33:39.461.fits | 113317 | 1.400 1.148 V | 0.60 0.51 V |  30.0 148.9 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:36:05.791.fits | 113317 | 1.400 1.152 V | 0.60 0.53 V |  30.0 148.8 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:38:32.605.fits | 113317 | 1.400 1.156 V | 0.60 0.56 V |  30.0 148.8 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:40:56.942.fits | 113317 | 1.400 1.161 V | 0.60 0.66 V |  30.0 148.8 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:43:22.904.fits | 113317 | 1.400 1.166 V | 0.60 0.57 V |  30.0 148.7 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:45:47.843.fits | 113317 | 1.400 1.171 V | 0.60 0.53 V |  30.0 148.7 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:48:11.894.fits | 113317 | 1.400 1.175 V | 0.60 0.51 V |  30.0 148.7 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:50:37.829.fits | 113317 | 1.400 1.181 V | 0.60 0.52 V |  30.0 148.6 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:53:05.682.fits | 113317 | 1.400 1.187 V | 0.60 0.50 V |  30.0 148.6 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:55:30.486.fits | 113317 | 1.400 1.193 V | 0.60 0.47 V |  30.0 148.6 V | 1.000 0.010 V
 ISAAC.2001-09-18T04:57:55.238.fits | 113317 | 1.400 1.198 V | 0.60 0.48 V |  30.0 148.5 V | 1.000 0.010 V
 ISAAC.2001-09-18T05:00:19.396.fits | 113317 | 1.400 1.204 V | 0.60 0.48 V |  30.0 148.5 V | 1.000 0.010 V
 -----------------------------------+--------+---------------+-------------+---------------+--------------

qc0_example.txt

Printed by whummel from web4