PG 2213-006

RA = 22:16:23 DEC = -00:21:41 (2000.0)

V B-V U-B V-R R-I V-I PG 2213-006 14.124 -0.217 -1.125 -0.092 -0.110 -0.203 A 14.178 0.673 0.100 0.406 0.403 0.808 B 12.706 0.749 0.297 0.427 0.402 0.829 C 15.109 0.721 0.177 0.426 0.404 0.830